Critical Values for T in the Wilcoxon Signed Mixed-Pairs Signed-Rank Test

The values below are the approximate critical values of T for two-tailed tests at level P. For a signicant result, the calculated T must be less than or equal to the tabulated value.

(Values of P are halved for one-tailed tests using R� and R+.)

n P = 0.10 P = 0.05 5 2 - 6 2 0 7 3 2 8 5 3 9 8 5 10 10 8 11 14 10 12 17 13 13 21 17 14 26 21 15 30 25 16 36 29 17 41 34 18 47 40 19 53 46 20 60 52 21 67 58 22 75 65 23 83 73 24 91 81 25 100 89