Critical Values dff for Multiple Comparisons based on the Kruskal-Wallis Test

k = the number of groups (treatments) n = the common sample size of each group

Nominal Family Type I Error Rate α (more accurate significance levels are in brackets) k b 0.10 0.05 0.03 0.01 3 2 - - 8 (.067) 8 (.067) 8 (.067) 3 3 14 (.111) 15 (.064) 16 (.029) 17 (.011) 3 4 21 (.106) 24 (.045) 25 (.031) 27 (.011) 3 5 29 (.106) 33 (.048) 35 (.031) 39 (.009) 3 6 38 (.103) 43 (.049) 46 (.030) 51 (.011) 4 2 11 (.086) 12 (.029) 12 (.029) 12 (.029) 4 3 20 (.108) 22 (.043) 23 (.023) 24 (.012) 4 4 31 (.097) 34 (.049) 36 (.026) 38 (.012) 5 2 14 (.121) 15 (.048) 16 (.016) 16 (.016) 5 3 27 (.084) 28 (.060) 30 (.023) 32 (.007) 5 4 - - 44 (.056) 46 (.033) 50 (.010) 6 2 - - 19 (.030) 19 (.030) 20 (.010) 6 3 - - 35 (.055) 37 (.024) 39 (.009) 7 2 - - 22 (.056) 23 (.021) 24 (.007) 7 3 - - 42 (.054) 44 (.026) 46 (.012) 8 2 - - 26 (.041) 26 (.041) 28 (.005) 8 3 - - 49 (.055) 51 (.029) 54 (.010) 9 2 - - 29 (.063) 30 (.031) 31 (.012) 10 2 - - 33 (.050) 34 (.025) 35 (.009) 11 2 - - 37 (.040) 38 (.020) 39 (.008) 12 2 - - 40 (.062) 41 (.033) 43 (.006) 13 2 - - 44 (.052) 45 (.028) 46 (.014) 14 2 - - 48 (.044) 49 (.024) 50 (.012) 15 2 - - 52 (.038) 52 (.038) 54 (.010)